3 x Sony SRG-A12 4K PTZ Camera with Built-in AI and 12x Optical Zoom (White) (SRGA12/W) + 3 x Network Cable + Cleaning Kit + 3 x HDMI Cable (Renewed)

Price: $7,014.95
(as of Nov 11,2024 09:39:42 UTC – Details)

Buy Now

Capture natural-looking camera movements even without an operator using the white SRG-A12 4K PTZ Camera with Built-In AI from Sony. Equipped with a 1/2.5″ Exmor R CMOS sensor and 12x optical zoom, this camera harnesses powerful AI-driven analytics to automatically frame and track your subject within the frame. Full Body, Waist, and Close-Up modes enable you to select the best option for your event with center, left, and right angles available for each mode.
Manufacturer Included Items:
Sony SRG-A12 4K PTZ Camera with Built-In AI and 12x Optical Zoom (White)
AC Power Adapter
IR Remote Control
2 x Ceiling Bracket
Wire Cable
9 x M3x8 Screw
M2.6×6 Screw (Black)
HDMI Cable Clamp

Bundle Items Include:
3 x Sony SRG-A12 4K PTZ Camera with Built-In AI and 12x Optical Zoom (White)
3 x Cat5e Ethernet Cable
1 x LCD Cleaning Kit
3 x HDMI Cable

Items Included:3 x Sony SRG-A12 4K PTZ Camera with Built-In AI and 12x Optical Zoom (White), 3 x Cat5e Ethernet Cable, 1 x LCD Cleaning Kit, 3 x HDMI Cable
Automated Subject Tracking: AI-driven analytics, coupled with a 1/2.5″ Exmor R CMOS sensor and 12x optical zoom, enable automatic subject framing and tracking within the frame. Offers versatile Full Body, Waist, and Close-Up modes with various angles for each mode.
Intuitive Status Monitoring: Includes a tally lamp that changes from red (On-Air) to green (Auto-Framing On), providing easy visual indication of the camera’s operational mode status for seamless monitoring during recordings or presentations.
Enhanced Zoom and Professional Features: Features a 24x Clear Image Zoom function, maintaining resolution while increasing magnification. Incorporates professional functionalities such as high-speed pan and tilt, 256 camera presets, autofocus, auto exposure, and white balance, ensuring precise control and customization for superior PTZ presentations.
Up to UHD 4K Resolution at 29.97 fps, 1/2.5″ Exmor R CMOS Sensor, Built-In AI Framing & Tracking Analytics, 12x Optical & 24x HD Clear Image Zoom, Full Body, Waist & Close-Up Frame Modes, 3G-SDI, HDMI & Ethernet Output, 340° Pan & 110° Tilt, Wide 70° Angle of View, Runs on PoE+ or DC Power, Remote Control & Ceiling Mount Included,

Buy Now